SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for city_list_ru
-- ----------------------------
CREATE TABLE `city_list_ru` (
  `id` int(11) NOT NULL COMMENT 'Country ID',
  `title` text NOT NULL COMMENT 'Name country (Title)',
  `area` text,
  `country` text,
  `region` text,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- ----------------------------
-- Table structure for country_list_ru
-- ----------------------------
CREATE TABLE `country_list_ru` (
  `id` int(11) NOT NULL COMMENT 'Country ID',
  `title` text NOT NULL COMMENT 'Name country (Title)',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- ----------------------------
-- Table structure for region_list_ru
-- ----------------------------
CREATE TABLE `region_list_ru` (
  `id` int(11) NOT NULL COMMENT 'Country ID',
  `title` text NOT NULL COMMENT 'Name country (Title)',
  `country` int(255) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;
